0˚

0˚

30˚

30˚

60˚

60˚

90˚

90˚

120˚

120˚

150˚

150˚

180˚

180˚

-150˚

-150˚

-120˚

-120˚

-90˚

-90˚

-60˚

-60˚

-30˚

-30˚

0˚

0˚

-60˚ -60˚

-30˚ -30˚

0˚ 0˚

30˚ 30˚

60˚ 60˚

Earthquake Depths 0 - 70 km 70 - 300 km 300 - 700 km