0˚ 30˚ 60˚ 90˚ 120˚ 150˚ 180˚ -150˚ -120˚ -90˚ -60˚ -30˚ 0˚

-60˚ -60˚

-30˚ -30˚

0˚ 0˚

30˚ 30˚

60˚ 60˚

-7.0 -6.0 -5.0 -4.0 -3.0 -2.0 -0.5 0.0 0.2 0.4 0.6 1.0 1.5 3.5 7.0 km